No help is available.


The LAN Hardware (HW) address of the device printed to by this port.


The IPX Network Number associated with this device. 00000000 is equivalent to the local subnet.


Enter the community name used by the device attached to this port.  Only enabled when SNMP is also enabled.


Enter Settings specific to the RAW Protocol.


The name of this port.


Choose the protocol this port should use.


Enter the device index used by the device attached to this port.  Only enabled when SNMP is also enabled.


Enter the QName to be used for this port.  This can be enabled by clicking the radio button lableld LPR in the Protocol group.


The name of this port.


Choose the protocol this port should use. LPR Protocol.


Choose the protocol this port should use. RAW Data Protocol.


Enter the QName to be used for this port.  This can be enabled by clicking the radio button lableld LPR in the Protocol group.


Enter Settings specific to the LPR Protocol.  Enable by clicking the radio button labeled LPR in the Protocol group.


Check if SNMP is supported for the device attached to this port.


Enter the device index used by the device attached to this port.  Only enabled when SNMP is also enabled.


The LAN Hardware (HW) address of the device printed to by this port.


Enter the community name used by the device attached to this port.  Only enabled when SNMP is also enabled.


The Berkeley Sockets port number used to print to this port.


Check if SNMP is supported for the device attached to this port.


The Berkeley Sockets port number used to print to this port.


Configure all Hewlett-Packard Standard IPX/SPX Port Monitor Ports.


Add a Hewlett-Packard Standard IPX/SPX Port.


Add a Hewlett-Packard Standard IPX/SPX Port.


Add a Hewlett-Packard Standard IPX/SPX Port.


View and modify settings for a Hewlett-Packard Standard IPX/SPX Port.


Add a Hewlett-Packard Standard IPX/SPX Port.


Digital readout displaying the number of minutes before timeout when a print job fails.


Digital readout displaying the number of minutes before timeout when a print job fails.


Shorter time before a timeout on print failures.


Enter the amount of time before a timeout on print failures.


Longer time before a timeout on print failures.


When checked the computer will periodically query each device for status information.


Enter the amount of time before a timeout on print failures.


Port Settings