No help is available.


The name or address of the device printed to by this port.


Enter the community name used by the device attached to this port.  Only enabled when SNMP is also enabled.


Enter Settings specific to the RAW Protocol.  Enable by clicking the radio button labeled RAW in the Protocol group.


The name of this port.


Choose the protocol this port should use.


Enter the device index used by the device attached to this port.  Only enabled when SNMP is also enabled.


Enter the QName to be used for this port.  This can be enabled by clicking the radio button lableld LPR in the Protocol group.


The name of this port.


Choose the protocol this port should use. LPR Protocol.


Choose the protocol this port should use. RAW Data Protocol.


Enter the QName to be used for this port.  This can be enabled by clicking the radio button lableld LPR in the Protocol group.


Enter Settings specific to the LPR Protocol.  Enable by clicking the radio button labeled LPR in the Protocol group.


Check if SNMP is supported for the device attached to this port.


Enter the device index used by the device attached to this port.  Only enabled when SNMP is also enabled.


The name or address of the device printed to by this port.


Enter the community name used by the device attached to this port.  Only enabled when SNMP is also enabled.


Enter the Berkeley Sockets port number to use for this port.  This can be enabled by clicking the radio button labeled RAW in the Protocol group.


Check if SNMP is supported for the device attached to this port.


Enter the Berkeley Sockets port number to use for this port.  This can be enabled by clicking the radio button labeled RAW in the Protocol group.


Configure all Standard TCP/IP Port Monitor Ports.


Add a Standard TCP/IP Port.


Add a Standard TCP/IP Port.


Add a Standard TCP/IP Port.


View and modify settings for a Standard TCP/IP Port.


Add a Standard TCP/IP Port.


Digital readout displaying the number of minutes before timeout when a print job fails.


Digital readout displaying the number of minutes before timeout when a print job fails.


Shorter time before a timeout on print failures.


Enter the amount of time before a timeout on print failures.


Longer time before a timeout on print failures.


When checked the computer will periodically query each device for status information.


Click if you encounter problems such as missing or incomplete documents when printing. When LPR byte counting is enabled, the computer counts the number of bytes in a document before sending it to the printer. Byte counting, which can be very time consuming, is not required by most printers. This option is available only when the LPR protocol is selected.


Enter the amount of time before a timeout on print failures.